MAX (expr)

Maximum value of 'expr' received so far; i.e. returns
the upper boundary of the envelope around 'expr'. 
After all steps have been executed this represents
the maximum value of 'expr' between START and
START+DUR.  Causes autoscaling to be performed
for plots.
